Table 1.1 - Budget

Tasks / Phases Human Effort (Hours) Financial (Dollars) Total Planned

Actual (to date)

Projected for completion

Total Planned

Actual (to date)

Projected for completion

Overhead

Team Meetings 140 60 85 n/a n/a n/a Research 60 50 12 n/a n/a n/a Deliverables

Project Proposal 15 15 0 n/a n/a n/a Web Page 24 2 10 n/a n/a n/a Project Poster 20 39 0 $35 $88 $0 Design Review 12 30 0 n/a n/a n/a Oral Presentation 45 0 45 $25 $0 $25 Further Documentation 12 4 12 n/a n/a n/a Project Development

Hardware / OS Configuration 50 20 35 $750 $0 $0 * PVM Implementation 24 18 25 $0 $0 $0 MPEG Code Evaluation 24 18 18 $0 $0 $0 Software Design 90 15 90 n/a n/a n/a Software Implementation 54 0 60 n/a n/a n/a Software Tests / Benchmarks 90 0 90 n/a n/a n/a

Total 660 271 482 $60 $88 $25

* Costs reflects the assumption that appropriate hardware can be found on campus or is available to team members at no charge.